en-us	Not Implemented in UAG component

en-us	The directory cannot be loaded

en-us	The user name is missing

en-us	The user name {p1} already exists

en-us	The user ID {p1} already exists

en-us	Cannot find user name {p1}

en-us	Cannot find user ID {p1}

en-us	The group name is missing

en-us	The group name {p1} already exists

en-us	The group ID {p1} already exists

en-us	Cannot find group name {p1}

en-us	Cannot find group ID {p1}

en-us	The component DB4D is required and missing

en-us	invalid password

en-us	The directory file is missing

en-us	UAG model is missing

en-us	Current session failed permission for group {p1}

en-us	Login Listener cannot be found

en-us	User name must be not empty

en-us	Group name must be not empty

en-us	Could not synchronyse with remote LDAP Directory

en-us	Group {p1} is not a remote group.

en-us	Alias must be not empty.

en-us	Cannot find the session handler module

en-us	The session handler call has failed

en-us	Cannot write the session

en-us	Cannot read the session

en-us	Cannot read the sessions for user

en-us	The session handler module path must be not empty

en-us	Cannot remove the session