en-us	Error description is not available.

en-us	Table '{key1}' is not declared in the FROM clause.

en-us	Column '{key1}' does not exist.

en-us	Column '{key1}' does not exist in the table '{key2}'.

en-us	Column name reference '{key1}' is ambiguous.

en-us	Table '{key1}' does not exist in the database.

en-us	Table alias '{key1}' is the same as table name.

en-us	Duplicate table alias - '{key1}'.

en-us	Duplicate table in the FROM clause - '{key1}'.

en-us	Operation {key1} {key2} {key3} is not type safe.

en-us	Cannot mix {key1} and {key2} types in the IN predicate.

en-us	Escape sequence '{key1}' in the LIKE predicate is too long. It must be exactly one character.

en-us	Bad escape character - '{key1}'.

en-us	Unknown escape sequence - '{key1}'.

en-us	Sub-query is not allowed to contain column functions in the context of its super-query.

en-us	Column function is not allowed.

en-us	UPDATE - aggregate functions are not allowed.

en-us	Sub-query produces more than one column.

en-us	GROUP BY index is not allowed.

en-us	GROUP BY index is not allowed for SELECT item at index {key1}.

en-us	Cannot mix column and scalar operations.

en-us	Cannot mix column and scalar operations {key1}.
en-us	Cannot mix column and scalar operations.

en-us	Scalar item in the SELECT list is not allowed when GROUP BY clause is present.

en-us	Query parameter is either not allowed or was not provided.

en-us	Sorting by indexed item in the SELECT list is not allowed - ORDER BY item {key1}.

en-us	Invalid ORDER BY index - {key1}.

en-us	Column '{key1}' is not a grouping column and cannot be used in the ORDER BY clause.

en-us	GROUP BY is not allowed with 'SELECT * FROM ...'.

en-us	Invalid GROUP BY index - {key1}.

en-us	Function {key1} expects one parameter, not {key2}.

en-us	Function {key1} expects {key2} parameters, not {key3}.

en-us	Parameter {key1} of type {key2} in function call {key3} is not implicitly convertible to {key4}.

en-us	Column references from more than one query in aggregate function {key1} are not allowed.

en-us	Nested aggregate functions are not allowed in the aggregate function {key1}.

en-us	Unknown function - {key1}.

en-us	HAVING is not an aggregate expression.

en-us	Duplicate column reference in the INSERT list - '{key1}'.

en-us	Duplicate column reference in the UPDATE list - '{key1}'.

en-us	INSERT value count {key1} does not match column count {key2}.

en-us	Column '{key1}' does not allow NULL values.

en-us	Table '{key1}' already exists.

en-us	More than one primary key is not allowed.

en-us	Duplicate column '{key1}' in the CREATE TABLE command.

en-us	Ambiguous foreign key name - '{key1}'.

en-us	Column count {key1} in the child table does not match column count {key2} in the parent table of the foreign key definition.

en-us	Column type mismatch in the foreign key definition. Cannot relate {key1} in child table to {key2} in parent table.

en-us	Failed to find matching column in parent table for '{key1}' column in child table.

en-us	UPDATE and DELETE constraints must be the same.

en-us	Invalid LIMIT value in SELECT command - {key1}.

en-us	Invalid OFFSET value in SELECT command - {key1}.

en-us	Primary key does not exist in table '{key1}'.

en-us	Column '{key1}' is not part of a primary key.

en-us	Column '{key1}' is not part of a primary key in table '{key2}'.

en-us	Bad data type length '{key1}'.

en-us	Failed to lock table for reading.

en-us	Unknown error code.

en-us	Failed to validate table '{key1}'.

en-us	Failed to validate FROM clause.

en-us	Failed to validate GROUP BY clause.

en-us	Failed to validate SELECT list.

en-us	Failed to validate WHERE clause.

en-us	Failed to validate ORDER BY clause.

en-us	Failed to validate HAVING clause.

en-us	Failed to validate COMPARISON predicate.

en-us	Failed to validate BETWEEN predicate.

en-us	Failed to validate IN predicate.

en-us	Failed to validate ALL ANY predicate.

en-us	Failed to validate EXISTS predicate.

en-us	Failed to validate IS NULL predicate.

en-us	Failed to validate subquery.

en-us	Failed to validate SELECT item {key1}.

en-us	Failed to validate column '{key1}'.

en-us	Failed to validate function '{key1}'.

en-us	Failed to validate CASE expression.

en-us	Failed to validate command parameter.

en-us	Failed to validate function parameter {key1}.

en-us	Failed to validate INSERT item {key1}.

en-us	Failed to validate UPDATE item {key1}.

en-us	Failed to validate column list.

en-us	Failed to validate foreign key

en-us	Failed to create record {key1}.

en-us	Failed to update field '{key1}'.

en-us	Failed to delete record '{key1}'.

en-us	Subquery must return one row at the most but instead it returns {key1}.

en-us	Division by zero.

en-us	Failed to validate SELECT command.

en-us	Failed to validate INSERT command.

en-us	Failed to validate DELETE command.

en-us	Failed to validate UPDATE command.

en-us	Failed to validate CREATE TABLE command.

en-us	Failed to validate DROP TABLE command.

en-us	Failed to validate ALTER TABLE command.

en-us	Failed to validate CREATE INDEX command.

en-us	Failed to validate LOCK TABLE command.

en-us	Failed to execute SELECT command.

en-us	Failed to execute INSERT command.

en-us	Failed to execute DELETE command.

en-us	Failed to execute UPDATE command.

en-us	Failed to execute CREATE TABLE command.

en-us	Failed to execute DROP TABLE command.

en-us	Failed to execute TRANSACTION command.

en-us	Failed to execute CREATE DATABASE command.

en-us	Failed to execute ALTER TABLE command.

en-us	Failed to execute CREATE INDEX command.

en-us	Failed to execute DROP INDEX command.

en-us	Failed to execute LOCK TABLE command.

en-us	Failed to execute WHERE clause.

en-us	Failed to execute GROUP BY clause.

en-us	Failed to execute HAVING clause.

en-us	Failed to aggregate.

en-us	Failed to execute DISTINCT.

en-us	Failed to execute ORDER BY clause.

en-us	Failed to build DB4D query.

en-us	Failed to parse timestamp.

en-us	Failed to parse duration.

en-us	Failed to calculate comparison predicate.

en-us	Failed to execute subquery.

en-us	Failed to calculate BETWEEN predicate.

en-us	Failed to calculate IN predicate.

en-us	Failed to calculate ALL/ANY predicate.

en-us	Failed to calculate LIKE predicate.

en-us	Failed to calculate LIKE predicate pattern.

en-us	Failed to calculate EXISTS predicate.

en-us	Failed to calculate IS NULL predicate.

en-us	Failed to perform arithmetic operation.

en-us	Failed to calculate function call '{key1}'.

en-us	Failed to calculate case expression.

en-us	Failed to calculate function parameter '{key1}'.

en-us	Failed to calculate 4D function call.

en-us	Failed to sort while executing ORDER BY clause.

en-us	Failed to calculate record hash.

en-us	Failed to compare records.

en-us	Failed to calculate INSERT value {key1}.

en-us	Failed to update field {key1}.

en-us	Auto-increment option is not allowed for column '{key1}' of type {key2}.

en-us	Cannot drop system schema

en-us	Access denied

en-us	Execution was interrupted by user

en-us	Character-set option is not allowed for column '{key1}' of type {key2}

en-us	Failed to validate REPLICATE command.

en-us	Failed to execute REPLICATE command.

en-us	Source and destination item count mismatch in the REPLICATE command.

en-us	Cannot replicate virtual column.

en-us	"Auto-generate" option is not allowed for column '{key1}' of type {key2}.

en-us	Database already exists.

en-us	Failed to validate Join clause.

en-us	The functionality is not implemented.

en-us	Database not found.

en-us	Duplicated column '{key1}' in the column list.

en-us	Failed to validate CREATE VIEW command.

en-us	Failed to validate DROP VIEW command.

en-us	Failed to execute CREATE VIEW command.

en-us	Failed to execute DROP VIEW command.

en-us	View '{p1}' already exists.

en-us	View '{p1}' doesn't exist.

en-us	Trying to drop an empty list of views.

en-us	Trying to drop view but '{p1}' is a table.

en-us	View '{p1}' doesn't belong to schema '{p2}'.

en-us	Duplicate view '{p1}' in FROM clause.

en-us	Alias '{p1}' has same name as view.

en-us	View '{p1}' has same name as alias.

en-us	No column selection expression.

en-us	View column named '{p1}' doesn't exist.

en-us	View column names must be unique.

en-us	Column alias '{p1}' is a duplicate.

en-us	Number of name definition(s) in CREATE VIEW doesn't match number of columns selected.

en-us	Failed to translate SELECT command with view(s).

en-us	Column name '{p1}' is ambiguous.

en-us	Column named '{p1}' doesn't exist.

en-us	Duplicate table reference to '{p1}' in FROM clause.

en-us	Table named '{p1}' doesn't exist.

en-us	Table alias '{p1}' is a duplicate.

en-us	Table alias '{p1}' is identical to table name.

en-us	Table column '{p1}' doesn't exist.

en-us	Schema ID {p1} (named '{p2}' at view creation) of view '{p3}' has been dropped.

en-us	Trying to create a view with the same name ('{p1}') as an existing table.

en-us	GROUP BY, ORDER BY, and HAVING are not allowed in view creation SELECT command.

en-us	View reference '{p1}.{p2}' is too complex for GROUP BY or ORDER BY.

en-us	Trying to create a view ('{p1}') with no columns (check for empty tables).

en-us	Index '{key1}' already exists.

en-us	Failed to validate join tree.

en-us	Failed to validate join condition. Exactly two tables must be used.

en-us	Failed to validate join condition. Join condition needs exactly one table from the left and one table from the right subtree.

en-us	Executing GROUP BY...

en-us	Executing HAVING...

en-us	Executing DISTINCT...

en-us	Executing ORDER BY...

en-us	Executing ORDER BY...

en-us	Executing SELECT...

en-us	Executing WHERE...

en-us	Executing INSERT...

en-us	Executing DELETE...

en-us	Executing UPDATE...

en-us	Calculating aggregate values...

en-us	Inserting rows...

en-us	SQL net session manager

en-us	SQL connection handler

en-us	Spare task

en-us	ServerNet select I/O handler

en-us	Shared pool worker

en-us	Exclusive pool worker

en-us	ServerNet shared load balancer