en-us	Error description is not available.

en-us	Access denied.

en-us	Invalid internal state.

en-us	Memory error.

en-us	Invalid argument.

en-us	HTTP request handler already exists.

en-us	Base64 decoding failed.

en-us	Base64 encoding failed.

en-us	HTTP request handler does not exists.

en-us	HTTP Server is being turned off.

en-us	HTTP Server Project does not exist.

en-us	Virtual Host already exists.

en-us	String not found.

en-us	Authentication referee already exists.

en-us	Cache rule already exists.

en-us	Cache rule expires.

en-us	The HTTP Server cannot be started.

en-us	Some HTTP Server Project Settings are already used. Check Port ({p1}), SSLPort ({p2}) or Hostname Settings ({p3}).

en-us	Virtual Folder already exists.

en-us	Hostname is missing in Project Settings.

en-us	Virtual Folder does not exist.

en-us	HTTP Server cannot use the listening IP Address ^0.

en-us	Some listening ports are already used. Check HTTP Port (^0) or HTTPS Port (^1).

en-us	HTTP connection handler

en-us	Spare task

en-us	TCP connection listener

en-us	TCP select I/O handler

en-us	Shared pool worker

en-us	Exclusive pool worker

en-us	TCP shared load balancer