en-us	Misssing parameter (expected {expected})

en-us	Misssing parameter (received {received}, expected {expected})

en-us	Invalid parameter number {number}.

en-us	The form object "{object}" does not exist.

en-us	The form object "{object}" is not of the correct type

en-us	The pathname is invalid. "{pathname}"

en-us	This BLOB could not be read. It may be damaged.